START = expr;              Set processing start time

Value of 'expr' specifies the start time for subsequent processing;
this, plus the current BIAS value, is the first value for the variable
T during an implicit loop.  Multiple start times may be specified
during an algorithm's execution but the start time must not be
reset within an implicit loop.
